\documentclass{ppex}
\nonstopmode

\pagestyle{empty}
\setlength\textwidth{207.0pt}
\begin{document}
\ResetPreambleCommands
\ReadyForTheFray

\newfont\gosign{gosign50}
\begin{center}
  \fbox{\gosign\symbol{0}}
\end{center}
\end{document}
