\documentclass{ppex}
\nonstopmode
\usepackage {m-chemic}
\pagestyle{empty}
\setlength\textwidth{207.0pt}
\begin{document}
\ResetPreambleCommands
\ReadyForTheFray
\usepackage {m-chemic}
\startchemical[size=small]
 \chemical[SIX,B,MOV1,B]
\stopchemical
\end{document}
